From 7152517f2586a5b40726365a756087ddddc099ca Mon Sep 17 00:00:00 2001
From: Ivan Topolnjak <ivantopo@gmail.com>
Date: Mon, 11 Feb 2019 23:16:54 +0100
Subject: self-review changes and use a thread pool for the embedded status
 page server

---
 kamon-status/src/components/ModuleStatusCard.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'kamon-status/src/components/ModuleStatusCard.vue')

diff --git a/kamon-status/src/components/ModuleStatusCard.vue b/kamon-status/src/components/ModuleStatusCard.vue
index d095d7b3..18e2b038 100644
--- a/kamon-status/src/components/ModuleStatusCard.vue
+++ b/kamon-status/src/components/ModuleStatusCard.vue
@@ -30,7 +30,7 @@ export default class ModuleStatusCard extends Vue {
   @Prop() private module!: Module
 
   get discoveryStatus(): string {
-    return this.module.isProgrammaticallyRegistered ? 'manual' : 'automatic'
+    return this.module.programmaticallyRegistered ? 'manual' : 'automatic'
   }
 
   get runStatus(): { message: string, color: string, icon: string } {
-- 
cgit v1.2.3

